Copyright: Copyright © 2000 Kaspersky Lab


About this help system

The particular help system describes purpose, customizing and using of updating utility. Text has several notation conventions:

Bold font	For windows captions, program names, filenames etc.	After pressing the particular button the program opens standard window “Browse Folders” where you may chose folder with updates.
Caution!	For notes and important information.	For more information about connection settings contact with system administrator of your network.
• Item 1; • Item 2;	For enumerations.	• start from main Windows menu; • automatic start from Control Center;
  Contact us


Additional updating servers
You may enter addresses of additional updating servers. These servers will be used alternatively in case of the main updating server failure until the updating process has been successfully completed. To enable the feature put a check mark opposite the Use alternative Internet addresses from the list option.

Caution! All updating servers use the same settings, which may be the case of the conflicts. For example, if a fail occurred while you were trying to connect with HTTP server, which was set for the updating utility to work with, the utility will try to connect with FTP server which was chosen as additional. This may result in a conflict since the HTTP server settings can prove to be unfit to receive updates from FTP server.


Address
Address – use the proxy-server (or Firewall) address for the connection.  You can type in the address in decimal notation (i.e., 125.5.29.1), in a full domain notation (i.e., test.russia.ru), or in short notation (i.e., test);


Antiviral bases
Antiviral bases contain information for detection and removing a lot of viruses. Kaspersky Lab updates antiviral bases with new information about viruses every week.


Append
Append – add new data to the existing file or create a new file every time.


Authorization
Authorization – customizing personal parameters.


Automatically connect on startup
Automatically connect on startup – dial-up automatically to IP immediately after starting the updating process. If you have chosen the automated connection feature to set up a remote access to IP, the program will enable the standard remote access utility (unless you have installed another one) after you start the updating process.


Automatically disconnect on exit
Automatically disconnect on exit – disconnect automatically (switch off the modem) after the updating process is completed.


Back
Back – return to the previous window.


Browse Folders
After pressing the particular button the program opens standard window Browse Folders where you may chose folder with updates.


CONT


Cancel
Cancel – exit from Wizard.


Control Center
Control Center provides centralized control of Kaspersky Antivirus components on workstation. It allows making flexible launch schedule and updates schedule of antiviral databases. Program works under Microsoft Windows 95, Windows 98 and Windows NT.


Dial-up settings

Element of tree-chart Dial-up settings sets up remote connection with IP. When setting up a remote connection you can enable the following check marks:

  Contact us


Feedback
If you have any suggestions on improvement of this reference system, please, contact Kaspersky Lab: support@kaspersky.com.


Finish
Finish – complete séance.


Forward
Forward – go to the next step of wizard.


HTTP proxy with FTP support
HTTP proxy with FTP support – FTP-server access via HTTP-proxy-server (CERN-proxy).


Help
Help shows help system.


ISP connection settings

Element of tree-chart Connection sets up connection with a remote server. You may chose one of the several way of connection:

  Contact us


Kaspersky Antivirus
Kaspersky Antivirus is the package of antivirus software by Kaspersky Lab, intended for both home users and corporate networks. You may get detailed information about Kaspersky Antivirus on http://www.kasperskylabs.com/products.asp. Furthermore you may buy Kaspersky Antivirus in our on-line shop. http://store.kaspersky.com/.


Kaspersky Lab
"Kaspersky Labs." is a leading Russian vendor of anti-virus safety systems: more than a half of Russian users have chosen the quality and reliability of our products. Being an independent corporate body, the company was founded in the summer of 1997. The development and commercial distribution of Kaspersky Labs. main product — Kaspersky Antivirus started in 1989.

Today Kaspersky Lab. is represented by more than 100 dealers and distributors from Russia and ex-USSR republics. Since 2000 Kaspersky Lab offers Web page owners an opportunity to join the Affiliate Program and get profit by distributing Kaspersky Antivirus via Internet. For more detail,  please, refer to http://www.kasperskylabs.com.

Address: Russia, 123363, Moscow, Geroyev Panfiloftsev, 10

Sales Dept.	+7 (095) 797-8700 +7 (095) 948-4331	globalsales@kaspersky.com
Help Desk Dept.	+7 (095) 797-8707	support@kaspersky.com
Marketing and Advertising Dept.	+7 (095) 948-5650	info@kaspersky.com
Antiviral Lab (for sending new viruses only):		newvirus@kaspersky.com


LAN settings

Element of tree-chart LAN Settings sets up IP connection using the local network. This element allows you either choose the settings from the “Control Panel” or configure the connection manually, i.e.:

If you have chosen the manual setup feature you need to do the following:

Contact your network system administrator for further information on the above connection setup.

  Contact us


Launch of Updating Utility

There are several ways to start the updating utility:

•	from Windows Main menu;

•	from the Control Centre (automated);

•	from the command line;

•	from other applications of  Kaspersky Antivirus package.

To start the updating utility from Windows Main menu, go to “Start” menu, then to “Programs” submenu, and click on the “AVP Updates” option in the “Antiviral Toolkit Pro” group.

With installed Control Center you can create a task to automatically start the updating utility

With installed Control Center you can create a task to automatically start the updating utility.

Alternatively you can start the updating program from the command line. Go to “AVP Shared Files” common folder and click on the avpupd.exe file.

  Contact us


Location settings

Element of tree-chart Location sets up the update location.

  Contact us


Password
Password – type in your access password.


Password for proxy
Password – password to access proxy-server or Firewall.


Port
Port – a proxy-server (or Firewall) connection port.


Purpose of Updating Utility

The updating utility is a part of Kaspersky Antivirus which is used for automated updating of antivirus databases with viruses descriptions, methods of infected files repair, and the package component.

The updating utility can copy antivirus databases and executable modules from Internet (using a network or remote connection) or from a Local Folder.

  Update via the Internet

  Update from the local folder

  Contact us


Report
Report – view report about updating process.


Report file
Report file – type in the report file name and its location.


Report file size limit
Size limit (Kb) – the maximum size of the report file. The file will be overwritten when the limit is exceeded.


Select objects to update

There are two options in the lower part of tree-chart

Select objects to update.

  Contact us


Set Internet settings manually
Set Internet settings manually – set up connection manually.


Show progress window
Advanced element allows setting up user interface. Inside this element there is the option Show progress window that shows “Update” window.


Technical support

For consultations related to installation, customizing and using this software you may address to our distributor or to “Kaspersky Lab” directly.

Address: Geroyev Panfilovtsev 10, Moscow, Russia.

Telephones: +7 (095) 797-8707

E-mail: support@kaspersky.com.


Tree-Chart
Tree-Chart is a control that presents data as a tree with standard controls as the nodes (buttons, list boxes, radio buttons etc). This control was designed by the programmers of "Kaspersky Lab" on the base of universal technology of interactive data viewþ This technology combines the advantages of hierarchical structuring of information and possibilities of standard controls.


Update anti-virus bases
Update executable files– copy the updated executable modules.


Update from the local folder

Element of tree-chart Update from the local folder allows to specify the full path to update folder.

  Contact us


Update via the Internet

Element of tree-chart Update via the Internet corresponds to Internet update mode. Settings of current mode are placed in the second level of tree.

  Contact us


Updating Utility interface description

The design of the updating utility interface is similar to Windows Wizard and consists of a sequence of windows (steps); which can be changed with Back and Forward buttons. To finish updating, click on Finish; to close the program at any stage, click on Cancel.

Tree-Chart element is located in the middle of each window (see Tree-Chart chapter for usage instructions). The control element configuration settings are grouped in a hierarchical tree.

  Contact us


Use Internet settings from Control Panel
Use Internet settings from Control Panel – choose the connection settings from the Control Panel.


Use Report
Element of tree-chart Use Report creates reports on the updating process.


Use a proxy-server
Use a proxy-server – use proxy-server or Firewall for IP connection.


Use passive mode FTP transfers
Use passive mode FTP transfers – use passive mode when working with FTP-server (essential for users connecting to IP via proxy-server or Firewall).


User name
User name – user individual settings.


User name for updating server
User name – type in your username to access the updating server.


Web-site
Visit Kaspersky labs Web-site – Internet Explorer will automatically open Kaspersky Lab WEB-site.


common folder
Common folder of Kaspersky Antivirus is called “AVP Shared Files”. It could be located for example on several path “C:\Program Files\Common Files\AVP Shared Files”.


update server
Choosing update server.


”Connection” window

Connection window on the first level of tree-chart allows you to set up the mode and object for updating.

  Contact us


”Finish” window

This is the last window where you can view the updating report (click on the Report button) and enable or disable the check mark Visit Kaspersky labs Web-site.

Click Finish button to finish a work session with the program. If you have enabled the check mark Visit Kaspersky labs Web-site Internet Explorer will automatically open Kaspersky labs WEB-site.

  Contact us


”Settings” window

In this window you can configure extra features of the antivirus databases updating program.

  Contact us


”Update” window

The window will appear only if you have placed the Show progress window check mark for the Advanced element in the Settings window.

The window consists of four parts showing stages of antivirus databases updating in progress:

•	Connecting to the server – connection to the source server for files download;

•	Loading file… - files are copied from the server to the computer (the name of the copied file is displayed on top, the scale of update completion is shown below);

•	Installing files… - files are installed onto the computer (the name of the installed file is displayed on top, the scale of the updating process completion is shown below);

•	Disconnecting… - connection session is over.

The level of completion is shown by the icon located to the left of the above messages  (the icon is displayed only when the corresponding part is being updated). Icon [image] indicates a successful completion of this part of the updating process, while [image] shows that the updating program is executing this part at the moment.

  Contact us


Îáíîâëÿòü àíòèâèðóñíûå áàçû
Update anti-virus bases – copy antivirus databases from the updating server.